0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 2 4 6 8 10 12 14 16 x 10^4 Casc. On-Off Param. Est., Off Peak Sess. 5

Time (sec)

Size (bytes)

Param. est’s based on n = 4 True Peak rate = 19.375 x 10^6 meanrate = 145806.2842 λ = 890.0775 μ = 371.6076

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 2 4 6 8 10 12 14 16 x 10^4 5 Casc. On-Off Simulated Traces

Time (sec)

Jumps "rounded" off