0.5 1 1.5 2 2.5 3 3.5 4 0 0.5 1 1.5 2 2.5 3 3.5 4 x 10^5

Trunc’d COO Param. Est., Peak Sess. 5

Time (sec)

Size (bytes)

True Peak rate = 19.375 x 10^6 meanrate = 68069.5802 Jumps shown

0.5 1 1.5 2 2.5 3 3.5 4 0 0.5 1 1.5 2 2.5 3 3.5 4 x 10^5

5 Casc. On-Off Simulated Traces

Time (sec)

Param. est’s based on n = 2 λ = 4308.6269 μ = 304.3425

0.5 1 1.5 2 2.5 3 3.5 4 0 0.5 1 1.5 2 2.5 3 3.5 4 x 10^5

5 Casc. On-Off Simulated Traces

Time (sec)

Param. est’s based on n = 4 λ = 861.7254 μ = 297.843

0.5 1 1.5 2 2.5 3 3.5 4 0 0.5 1 1.5 2 2.5 3 3.5 4 x 10^5

5 Casc. On-Off Simulated Traces

Time (sec)

Param. est’s based on n = 8 λ = 50.6897 μ = 52.0897