0.3 0.4 0.5 0.6 0.7 0 2 4 6 8 10 12 x 10^4 Off Peak Sess. 1

Time (sec)

Size (bytes)

True Peak rate = 19.375 x 10^6 meanrate = 84334.6027 Jumps shown

4 5 6 7 x 10^{-5} 0 0.5 1 1.5 2 2.5 3 x 10^6

KDE Family Plot - On Times

0.020.04

0.05 0.1 0.15 0.2 0.25

Weibull QQ Plot - Off Times

Weibull, Q

Data Q

α = 0.66781 σ = 0.0054649

-10 -8 -6 -4

-8 -6 -4 -2 log Weibull QQ Plot - Off Times

Weibull-log, Q log Data Q

α = 0.66781 σ = 0.0054649

-10 -8 -6 -4 -2

-8 -6 -4 -2 log Pareto QQ Plot - Off Times

Pareto-log, Q

α = 0.87215 σ = 0.001464

0.05 0.1 0.15 0.2 0.25 0 50 100 150 200 250 300 KDE Family - Off Times

SiZer map - Off Times

log10(h)

0 0.1 0.2

-2.5 -2 -1.5 -1 -0.5

-4 -3 -2 -1 0 1 2 3 4 KDE Family - log_{10} Off Times

SiZer map - log_{10} Off Times

-4 -3 -2 -1

-1.5 -1 -0.5 0 0.5