0 50 100 0

0.2

0.4

0.6

0.8

1 X_1 process

intensity

0 50 100 0

0.2

0.4

0.6

0.8

1 X_2 process

0 50 100 0

0.2

0.4

0.6

0.8

1 X_3 process

0 20 40 60 80 100 0 1 2 3 4 5 6 7 8 9 Z_1, Z_2, Z_3 processes

time (sec)

0 20 40 60 80 100 0

500

1000

1500

2000

2500

Cumulative Z_1, Z_2, Z_3

time (sec) size (bytes)