0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1 CC C.D.F., Unif(0,1) Gen.

time cumulative rate

level n = 11

0 0.2 0.4 0.6 0.8 1 0

20

40

60

80

100

120 CC Rate function, Unif(0,1) Gen.

time

Ri(t)

0 0.2 0.4 0.6 0.8 1 -10 -8 -6 -4 -2 0 2 4 log_{10} CC Rate function, Unif(0,1) Gen.

time log10(Ri(t))

0 0.2 0.4 0.6 0.8 1 0 100 200 300 400 500 600 700 800 CC Rate function, Unif(0,1) Gen.

time