100 200 300 50 100 150 200 250 300

x y

Raw Data Prob. Int. Trans.

0.2 0.4 0.6 0.8 0

1

2

3

θ / (π / 2)

Raw Data

0.2 0.4 0.6 0.8 0

1

2

3

θ / (π / 2)

APIT Data

0.2 0.4 0.6 0.8 0

1

2

3

θ / (π / 2)

APIT & top 500