100 200 500 1000 2000 5000 10000 0 0.2 0.4 0.6 0.8 1 ICRT method

Threshold values

EDM

100 200 500 1000 2000 5000 10000 0 0.2 0.4 0.6 0.8 1 Angular Rank method

Threshold values