0 50 100 150 200 0

0.2

0.4

0.6

0.8

1 Auto Corr., Dur. = Par(2.5)

lag ρ

Mean Dur. = 0.02 # Connections = 50000 # bins = 1000

0 50 100 150 200 -2

-1.5

-1

-0.5

0 log_{10} Auto Corr., Rate = Const.

log_{10}(lag) log10(ρ)

Exp. fit

880 900 920 940 960 980 0

0.005

0.01

0.015

0.02

Dist’n of Active Conn’s (2nd 1/2)

X, Counts density

N(935,21) fit

880 900 920 940 960 980

900

920

940

960

980 Gaussian Q-Q plot, Act. Conn.

Gaussian, Q

Data Q

n = 501