0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1 0 200 400 600 800 1000

25 Bin Dec. Histo.

Counts / unit time

sd = 28.8438 m = 0.02

0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1 0 200 400 600 800 1000

, Dur. = Exp(0.02)

sd = 29.7834 m = 0.005

0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1 0 200 400 600 800 1000

Mean Dur. = 0.02

sd = 30.2087 m = 0.00125

0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1 0 200 400 600 800 1000

# Connections = 50000, # bins = 1600

sd = 29.5617 m = 0.0003125