0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1 0

10

20 25 Bin Exp. Histo., Dur. = Exp(0.0002), Mean Dur. = 0.0002

Counts / unit time

sd = 0.95338 m = 0.02

0.64 0.66 0.68 0.7 0.72 0.74 0 10 20 30 Restriction to region between bars

sd = 2.4348 m = 0.005

0.66 0.665 0.67 0.675 0.68 0.685 0 10 20 30 Restriction to region between bars

sd = 3.8886 m = 0.00125

0.665 0.666 0.667 0.668 0.669 0.67 0.671 0 10 20 30 40 Restriction to region between bars

sd = 5.4062 m = 0.0003125