0 0.002 0.004 0.006 0.008 0.01 0.012 0.014 0.016 0.018 0.02 0

1

2

3

4

5

6

7 25 Bin Dec. Histo., Dur. = Par(1.5), Mean Dur. = 0.0002

m sd(counts / time)

Exp(0.0002) Par(10) Par(2.5) Par(1.5)

-12 -11 -10 -9 -8 -7 -6 -5

-0.5

0

0.5

1

1.5

2

2.5

3 # Connections = 50000, # bins = 1600

log_2(m) log2(sd(counts / time))

1-H = .50, slope = -0.45763 1-H = .50, slope = -0.38081 1-H = .50, slope = -0.4318 1-H = .25, slope = -0.27684