500 1000 1500 2000 2500 3000 3500 4000 4500

2.6

2.65

2.7

2.75

2.8

Lab Trace, Light load

time (sec)

Slope SiZer Map

time (sec) log10(h)

0 500 1000 1500 2000 2500 3000 3500 4000 4500

1.5

2

2.5

3

3.5