200 400 600 800 1000 1200 1400 1600 1800 2000 0

1

2

3

4

5

6

7 x 10^{-4} Michelle Weigle’s simulated Start Times

SiZer Map, n = 250000, 128 new conn’s / sec log10(h)

200 400 600 800 1000 1200 1400 1600 1800 2000 0.5

1

1.5

2

2.5