0 20 40 60 80 100 120 140 160 180 200 0 0.2 0.4 0.6 0.8 1 UNC main link, incoming Autocorrelation

lag ρ

0 20 40 60 80 100 120 140 160 180 200 -3 -2.5 -2 -1.5 -1 -0.5 0 For Packet Sizes, from n = 1000000 Packets

lag log10(ρ)

Exp. fit, lags 1-50,ϕ = 0.988

0 0.5 1 1.5 2 -3 -2.5 -2 -1.5 -1 -0.5 0 10000 bins, scale m = 0.01943

log_{10}(lag)

Poly. fit, lags 1-50, power = -0.238