-3 -2.5 -2 -1.5 -1 -0.5 0 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 UNC mainlink, outgoing

log_{10}(scale)

L. R. D. R 2

-3 -2.5 -2 -1.5 -1 -0.5 0 -2

-1.5

-1

-0.5

0

0.5 power, from autocorrelations

log_{10}(scale) power

-3 -2.5 -2 -1.5 -1 -0.5 0 0.7 0.75 0.8 0.85 0.9 0.95 1 1.05 1.1 From n = 1000000 Packets

log_{10}(scale) ϕ

-3 -2.5 -2 -1.5 -1 -0.5 0 0 0.2 0.4 0.6 0.8 1 1.2 1.4 Hurst Param., Packet Sizes

log_{10}(scale)

H