0 0.2 0.4 0.6 0.8 1 0

500

1000

1500

2000

2500

UNC main link, incoming

0 0.2 0.4 0.6 0.8 1 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 Packet Sizes

Gaussian, Q

Data Q μ = 0.49999 σ = 0.13068

0.2 0.4 0.6 0.8 0 0.5 1 1.5 2 2.5 3 3.5 All CC gen’s, levels j = 6 - 15

CC Gen.

nbin = 65536

CC Gen.

log10(h)

0.2 0.4 0.6 0.8

-2.2 -2 -1.8

-1.6

-1.4

-1.2 -1