0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1 Peak Sess. 1

0 0.2 0.4 0.6 0.8 1

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 Residuals from line

Avg RSS = 0.014724

0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1 Fit Broken Line

0 0.2 0.4 0.6 0.8 1

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 Resid’s from Broken Line

Prop. SS expl. = 0.96344