0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1 Peak Sess. 4

0 0.2 0.4 0.6 0.8 1

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

0.08

Residuals from line

Avg RSS = 0.0011565

0 0.2 0.4 0.6 0.8 1 0

0.2

0.4

0.6

0.8

1 Fit Broken Line

0 0.2 0.4 0.6 0.8 1

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

0.08

Resid’s from Broken Line

Prop. SS expl. = 0.73918