-5 0 5 10 15 0

2

4

6

8

10

12

14

16 HTTP R. S., Pareto Q-Q, 0.99 & 0.9999 quant. matched, n = 655368

Pareto-log, Q log Data Q NZ Wed. Morn.

α = 1.2611

σ = 1438.789

0.1 quantile 0.5 quantile

0.9 quantile 0.99 quantile 0.999 quantile 0.9999 quantile