-4 -3 -2 -1 0 1 2 3 4

-0.7

-0.6

-0.5

-0.4

-0.3

-0.2

-0.1

0 (a)

log10(duration)

Transformation of 1-F

0 2000 4000 6000 8000 10000 12000 14000 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 (b)

time (sec)

Random Height