0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 -1

-0.5

0

0.5

1

1.5

2

2.5

3 Haar decomposition of a histogram

θ_{2,0} = 1 θ_{2,1} = -0.41 θ_{2,2} = 0.89 θ_{2,3} = -0.12

Scale m