0 1 2 3 4 5 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Raw Gaussian 2a

x^1 x2

Point Cloud View

Total SS = 661.7251

Mean SS = 606.437

Frac. of Total = 91.6449%

Mean Resid. SS = 55.2881

Frac. of Total = 8.3551%

0 0.5 1 1.5 2 2.5 3 0

1

2

3

4

5 Raw Gaussian 2a

Coordinate

Curve Height

Curve View n = 25, d = 2