1 2 3 0 1 2

Raw Data

Fans

1 2 3 0 1 2

Mean 65.1679% of Tot

1 2 3 -1 0 1

Mean Resid. 34.8321% of Tot

0 1 2 3 0

0.5

1

PC R-squareds

PC #

R2

Standard PCA

1 2 3 -1 0 1

PC1

1 2 3 -1 0 1

resid, PC1

13.3447% of last

1 2 3 0 1 2

Mean +- PC1

86.6553% of MR

-1 0 1 2 0 0.1 0.2 0.3 0.4 kde, PC1

1 2 3 -1 0 1

PC2

1 2 3 -1 0 1

resid, PC2

6.1313% of last

1 2 3 0 1 2

Mean +- PC2

12.5265% of MR

-0.5 0 0.5 0

0.5

1

kde, PC2

1 2 3 -1 0 1

PC3

1 2 3 -1 0 1

resid, PC3

0% of last

1 2 3 0 1 2

Mean +- PC3

0.8182% of MR

-0.1 0 0.1 0.2 0 1 2 3 4 kde, PC3