5 10

0

20

40 Raw Data

Parabs & 2 Outliers

5 10

0

20

40 Center: Mean 86.57% of Tot

5 10 -20 0 20 Center Resid. 13.43% of Tot

0 5 10 0

0.5

1 PC R-squareds

PC #

R2

Standard PCA

5 10 -20 0 20 PC1 Proj.

5 10 0

20

40 Center +- PC1

65.79% of CR

5 10 -20 0 20 Resid, PC1

34.21% of above

-20 0 20 0

0.01

0.02

Scores kde, PC1

5 10 -20 0 20 PC2 Proj.

5 10 0

20

40 Center +- PC2

19.45% of CR

5 10 -20 0 20 Resid, PC2

70.44% of above

-40 -20 0 0

0.05

0.1 Scores kde, PC2

5 10 -20 0 20 PC3 Proj.

5 10 0

20

40 Center +- PC3

10.07% of CR

5 10 -20 0 20 Resid, PC3

48.23% of above

-10 0 10 20 0 0.02 0.04 0.06 0.08 Scores kde, PC3

5 10 -20 0 20 PC4 Proj.

5 10 0

20

40 Center +- PC4

2.699% of CR

5 10 -20 0 20 Resid, PC4

73.2% of above

0 5 10 0 0.05 0.1 0.15 Scores kde, PC4