-4 -2 0 2 4 -4 -2 0 2 4 mean, kercli 62.7949% of MR

-4 -2 0 2 4 -4 -2 0 2 4 mean, kercli 16.3119% of MR

-4 -2 0 2 4 -4 -2 0 2 4 mean, kercli 9.2451% of MR

-4 -2 0 2 4 -4 -2 0 2 4 mean, kercli 7.526% of MR

-4 -2 0 2 4 -4 -2 0 2 4 mean + PC1

-4 -2 0 2 4 -4 -2 0 2 4 mean - PC1

-4 -2 0 2 4 -4 -2 0 2 4 mean + PC2

-4 -2 0 2 4 -4 -2 0 2 4 mean - PC2

-4 -2 0 2 4 -4 -2 0 2 4 mean + PC3

-4 -2 0 2 4 -4 -2 0 2 4 mean - PC3

-4 -2 0 2 4 -4 -2 0 2 4 mean + PC4

-4 -2 0 2 4 -4 -2 0 2 4 mean - PC4

-0.2 0 0.2 0

5

10 Projections

-0.1 0 0.1 0 5 10 15 20 Projections

-0.05 0 0.05 0 5 10 15 20 Projections

-0.1 0 0.1 0 10 20 30 40 Projections

Static PCA, using mean and PCA, for file list: kercli, 22-Jul-1999 NMAX = 10 r0 = 4