-30 -20 -10 0 10 20 30 0 0.005

0.01

0.015

0.02

0.025

0.03

Mass Flux PC1 Proj’s

5 10 15 20 25 30 35 40 0 5 10 15 20 25 30 Mass Flux Raw Data

5 10 15 20 25 30 35 40

-10

-5

0

5

10

Mass Flux Mean Residuals

5 10 15 20 25 30 35 40

-10

-5

0

5

10

Mass Flux PC 1