10 20 30 40 0 5 10 15 20 25 30 Mass Flux Raw Data

10 20 30 40 -10

-5

0

5

10

Mass Flux Mean Residuals

10 20 30 40 -10

-5

0

5

10

Mass Flux PC 1

10 20 30 40 -10

-5

0

5

10

Mass Flux PC 2

10 20 30 40 -10

-5

0

5

10

Mass Flux Redirected PC 3

10 20 30 40 -10

-5

0

5

10

Mass Flux Redirected PC 4