95 100 105 110 115 120

0.7072

0.7073

0.7074

0.7075

Bralower’s Fossils

Age (mil. years)

Strontium Ratio

95 100 105 110 115 120

0.7072

0.7073

0.7074

0.7075

3 Smooths of Bralower’s Fossils

Age (mil. years)