0 200 400 600 800 1000 1200 1400 1600 1800 2000 0

1

2

3

4

5

6 x 10^{-4} UNC main link 2000, incoming, Off Peak, ip

time (sec)

SiZer, based on 5000000 packet time stamps

time (sec) log10(h)

0 500 1000 1500 2000 1

1.5

2

2.5

3