-18 -16 -14 -12 -10 -8 -6 -4 -12

-11

-10

-9

-8

-7

-6

-5

-4

-3

-2 n = 114665, Peak IP flow int’arr. times, q_1 = 0.9, q_2 = 0.99

Weibull-log, Q log Data Q α = 0.91333

σ = 0.0022149

0.01 quantile

0.05 quantile

0.1 quantile

0.5 quantile

0.9 quantile