40 60 80 100 120 140 160 180 200 220 240 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

1 1000 out of 99089, over window of 0.8, Peak IP 60 sec. thresh’d Conn’s

time (sec)

Random Height

Mean Conn. time = 14.7154 Median Conn. time = 0.9074 Frac. Full Window = 0.022