200 400 600 800 1000 1200 1400 0

0.5

1

1.5

2

2.5

3 x 10^{-3}

Simul’n using n = 111822 Weibull(0.1,4.337e-009) waiting times

time (sec) intensity

SiZer analysis of Intensity Function

time (sec) log10(h)

0 200 400 600 800 1000 1200 1400

1

1.5

2

2.5

3