0.5 1 1.5 2 2.5

0.05 0.1 0.15 0.2 n = 111822, Off Peak IP flow starts, after 0.2

Weibull, Q

Data Q α = 0.45 σ = 0.011488 0.5 quantile

0.75 quantile

0.9 quantile

0.99 quantile

0.999 quantile