0 20 40 60 80 100 0

20

40

60

80

100

120 Casc. On-Off Examples - μ

meanrate = 1 n = 4 λ = 1 μ = 1

0 20 40 60 80 100 0

20

40

60

80

100 Casc. On-Off Examples - μ

meanrate = 1 n = 4 λ = 1 μ = 2

0 20 40 60 80 100 0

20

40

60

80

100 Casc. On-Off Examples - μ

meanrate = 1 n = 4 λ = 1 μ = 4

0 20 40 60 80 100 0

20

40

60

80

100 Casc. On-Off Examples - μ

meanrate = 1 n = 4 λ = 1 μ = 8