0 20 40 60 80 100 0 20 40 60 80 100 120 140 10 Casc. On-Off Examples

meanrate = 1 n = 8 λ = 1 μ = 1

0.005 0.01 0.015 0.02 0.025

0.005

0.01

0.015

0.02

0.025

0.03

0.035

Weibull QQ Plot - On Times

Weibull, Q

Data Q

α = 1.0154 σ = 0.0041194

10 20 30 40 50 60 5 10 15 Weibull QQ Plot - Off Times

Weibull, Q

α = 0.38713 σ = 0.48606

-15 -10 -5 0 -10 -8 -6 -4 -2 0 2 log Weibull QQ Plot - Off Times

Weibull-log, Q log Data Q

α = 0.38713 σ = 0.48606