0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

0.2

0.4

0.6

0.8

1

1.2

1.4

1.6

1.8 Weibull Densities

For n = 1,α = 0.943, σ = 0.92

For n = 2,α = 0.87, σ = 0.93

For n = 4,α = 0.602, σ = 0.744

For n = 8,α = 0.387, σ = 0.486