0.005 0.01 0.015 0.02 0.025 0.03

0.005

0.01

0.015

0.02

0.025

0.03

0.035

n = 85375, Peak IP, after 0.2, q_1 = 0.9, q_2 = 0.99

Weibull, Q

Data Q α = 0.93487

σ = 0.0024083

0.5 quantile 0.75 quantile 0.9 quantile

0.99 quantile

0.999 quantile