0 50 100 150 200 250 0 1 2 3 4 5 6 7 8 9 10 x 10^{-3} n = 114665, Peak IP "raw" flow-start times

time (sec) intensity

SiZer analysis of Poisson Intensity

time (sec) log10(h)

0 50 100 150 200 250

0.5

1

1.5

2

2.5