-4 -3.5 -3 -2.5 -2 -1.5 -1 -0.5 0 0

0.5

1

1.5

2

2.5

3 Q-Q Plot, Respsize, n = 734814, q_1 = 0.5, Est’dα

log_{10}(1-q_2) α

-4 -3.5 -3 -2.5 -2 -1.5 -1 -0.5 0 200

400

600

800

1000

1200

1400

1600

1800

Q-Q Plot, Respsize, n = 734814, q_1 = 0.5, Est’dσ

log_{10}(1-q_2) σ