4 6 8 10 12 14 16 18 4

6

8

10

12

14

16

18 Q-Q Plot, Respsize, n = 734814, q1 = 0.99, q2 = 0.999

Pareto-log, Q log Data Q α = 1.2405

σ = 1498.6805

0.1 quantile

0.5 quantile

0.9 quantile