-50 -40 -30 -20 -10 0 10 0

5

10

15 Q-Q Plot, Respsize, n = 734814, q1 = 0.99, q2 = 0.999

Weibull-log, Q log Data Q α = 0.21601 σ = 50.9083

0.1 quantile 0.5 quantile 0.9 quantile