1 1.5 2 2.5 3 3.5 4 4.5 5 -11

-10

-9

-8

-7

-6

-5 S.D. of bars in Expanding Histograms

Histogram Level log2(sd of barhts/n)

MCNC Network Data, slope = 0.39117 i.i.d. Uniform, slope = 0.95441 μ, m_0 = 0.4, slope = 0.10914