-10 -5 0 5 10 -12

-10

-8

-6

-4

-2

0

2

4

6 115548, from wind = 0.8, Off Peak IP "Raw" Connections, q_1 = 0.8, q_2 = 0.9

LogNormal, Q log Data Q μ = 0.11119

σ = 3.3984

0.5 quantile

0.8 quantile 0.9 quantile

0.99 quantile