400 600 800 1000 1200 1400 1600 1800 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

1 Simulated Pareto, window = 0.8, Off Peak IP "Raw" Connections

time (sec)

Random Height

Mean Conn. time = 6262.4912 Median Conn. time = 6.4821 Frac. Full Window = 0.005