0 50 100 150 200 250 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

1 1000 out of 114665, that overlap window of 1, Peak IP "Raw" Connections

time (sec)

Random Height

Mean Conn. time = 21.7243 Median Conn. time = 1.2193 Frac. Full Window = 0