-2 0 2 4 6 8 10 12 14

4

6

8

10

12

14

Q-Q Plot, Respsize, 1st 50000, q1 = 0.99, q2 = 0.999

LogNormal, Q log Data Q

μ = 6.0475

σ = 2.0011