-2 0 2 0 0.1 0.2 0.3 IC 8 (Scal.)

Proj’n of Schizos, n = 40

Proj’n of Controls, n = 31 Kurt = -1.026

-2 0 2 0 0.1 0.2 0.3 0.4 IC 6 (Full 8 ICA)

Proj’n of Schizos, n = 40

Proj’n of Controls, n = 31 Kurt = -0.90162

-2 0 2 0 0.1 0.2 0.3 0.4 IC 4 (Sph.)

Proj’n of Schizos, n = 40

Proj’n of Controls, n = 31 Kurt = -0.84824

-2 0 2 0

0.2

0.4 IC 3 (A. Kurt., PCs)

Proj’n of Schizos, n = 40

Proj’n of Controls, n = 31 Kurt = 0.5814

-4 -2 0 2 4 0 0.2 0.4 0.6 IC 7 (Simul. Max.)

Proj’n of Schizos, n = 40

Proj’n of Controls, n = 31 Kurt = 2.7169

-4 -2 0 2 4 0

0.2

0.4 IC 5

Proj’n of Schizos, n = 40

Proj’n of Controls, n = 31 Kurt = 3.3462

-5 0 5 0 0.2 0.4 0.6 IC 2

Proj’n of Schizos, n = 40

Proj’n of Controls, n = 31 Kurt = 5.5457

-5 0 5 0 0.2 0.4 0.6 IC 1

Proj’n of Schizos, n = 40

Proj’n of Controls, n = 31 Kurt = 18.4172