5 10

0

20

40 Raw Data

5 10

0

20

40 Mean

5 10 -10 0 10 Mean Residuals

5 10 -2 0 2 Sphered Data

5 10 -10 0 10 Ori. Scale IC1

5 10 -10 0 10 Ori. Scale Resid, IC1

5 10 -2 0 2 Sphered IC1

5 10 -2 0 2 (Sph.) Resid, IC1

-4 -2 0 2 0 0.1 0.2 0.3 0.4 kde, (Sph.) IC1

5 10 -10 0 10 Ori. Scale IC2

5 10 -10 0 10 Ori. Scale Resid, IC2

5 10 -2 0 2 Sphered IC2

5 10 -2 0 2 (Sph.) Resid, IC2

-4 -2 0 0 0.1 0.2 0.3 0.4 kde, (Sph.) IC2

5 10 -10 0 10 Ori. Scale IC3

5 10 -10 0 10 Ori. Scale Resid, IC3

5 10 -2 0 2 Sphered IC3

5 10 -2 0 2 (Sph.) Resid, IC3

-1 0 1 0 0.1 0.2 0.3 0.4 kde, (Sph.) IC3