-6 -4 -2 0 2 4 6 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 1st dim: 20 N(-4,1) & 20 N(4,1), other dim’s: N(0,1)

x_1 density

1 2 5 10 15 20 30 40 50 0.3

0.4

0.5

0.6

0.7

0.8

0.9

1 CV Proportion Correctly Classified, mu = +-4

dimension, d

Proportion Correct

Bayes FLD GLR SVM, C = 10^{12} SVM, C = 10^3 SVM, C = 10^{-6}