88 89 90 91 92 93 94 95 96 0 0.05 0.1 0.15 0.2 0.25

year

PPM

Event Times

Background Times

0 0.05 0.1 0.15 0.2 0.25 0 5 10 15 20

curve density

Event Avg. = 0.072879 Bkgd Avg. = 0.10059 p-val for diff. = 1.1164e-006

Event Times Background